Created: 21-mar93 at 17:16:50 File: /tmp_mnt/home/bewick/multiplier/multf_cp.sp Date: Sun Mar 21 17:35:06 1993 PST

TIME

V O L T A G E

8 14 20 26 32 38

[1.0e- 9]

2.5

2.9

3.3

3.7

4.1 multf_cp.tr0 VB2 multf_cp.tr0 4 multf_cp.tr0 3 multf_cp.tr0 1 multf_cp.tr0 VB1 multf_cp.tr0 2

Delta: 5.163 nS, -0.210 V